Massachusetts Institute of Technology Handout 13 6.915: Network and Computer Security October 5, 1995 Professor Ronald L. Rivest

Readings for Lecture 9

Attached is the following list of papers

ffl A Performance Evaluation of Biometric Identification Devices by Holmes et al. [HMW90]

ffl The S/KEY One-Time Password System [Hal94].

References

[Hal94] Neil M. Haller. The S/KEY one-time password system. In ISOC, 1994.

[HMW90] J.P. Holmes, R.L. Maxwell, and L.J. Wright. A performance evaluation of biometric identification devices. Technical report, Sandia National Laboratories, July 1990.