%%% SAMPLE TITLE PAGE:

\documentstyle{article}

\topmargin 0pt
\advance \topmargin by -\headheight
\advance \topmargin by -\headsep

\textheight 8.9in

\oddsidemargin 0pt
\evensidemargin \oddsidemargin
\marginparwidth 0.5in

\textwidth 6.5in

\parskip=10pt
\parindent=0pt

\pagestyle{empty}

\def\brule#1{\vrule width#1 height -1.1pt depth 1.5pt\relax}
\begin{document}

\begin{center}\baselineskip=1.5\baselineskip
Massachusetts Institute of Technology \\
Department of Electrical Engineering and Computer Science\\[\bigskipamount]
Proposal for Thesis Research in Partial Fulfillment\\
of the Requirements for the Degree of\\
Master of Science
\end{center}

Title: A Novel Design of a Delay-Line Pulse Integrator

\begin{tabular*}{\textwidth}{@{}l*2{@{\extracolsep{\fill}}l}}
Submitted by:   & A. B. Cook                & \brule{2.5in} \\
                & Ashdown House, Room 675   & (Signature of author) \\
                & Cambridge, MA 02139
\end{tabular*}

Date of submission: March 10, 1992

Expected Date of Completion: September 1992

Laboratory where thesis will be done: Research Laboratory of Electronics

Brief Statement of the Problem:

Recirculating quartz delay lines have frequently been employed for
pulse integration in radar systems.  A novel modulation and feedback
system is proposed which should permit much longer effective
integration time to be achieved with the same stability margin as in
present designs.  A bread-board model will be constructed.

Supervision Agreement:

The program outlined in this proposal is adequate for a Master's
thesis.  The supplies and facilities required are available, and I am
willing to supervise the research and evaluate the thesis report.

\begin{flushright}
\begin{tabular}{@{}l}
\brule{2.5in} \\
D. E. Fox, Assoc. Prof. of Elec. Eng.
%% Include the following only if this is a VI-A or EIP thesis
\\[.3in]
\brule{2.5in} \\
G. H. Iverson, Company Supervisor
\end{tabular}
\end{flushright}

\end{document}
